FUNCTION NAME eixm_OutputSizeGet - Calculate the height and width of the output image SYNTAX

#include <eixm_TM.h>

void eixm_OutputSizeGet( eo )

Arguments

Eixm_Options *eo;/* Options structure */

DESCRIPTION

This function calculates the height and width of the output image based on the (ulx, uly, lrx, lry) values or, if they are not present, on the height and width of the input image. It also calculates default values for the corner points if necessary. If ulx, uly, lrx or lry are outside the bounds of the image, it sets them to the largest or smallest values within the extent of the image.

RETURN VALUES No value is returned.

From ERDAS IMAGINE eixm On-Line Help. Copyright (c) 1982-1997 ERDAS, Inc.